)c (GeV/ Tp 0 1 2 3 4 5 6 7 8

AA R

0 0.2 0.4 0.6 0.8 1 1.2 1.4_{= 0.2 TeV} NNs = 2.76 TeV and Au-Au NNs Pb-Pb 8% ± 20% global sys.=

<4, centrality 0% y , 2.5<

-μ^+μ→ψ

ALICE J/ 10% ± 20% global syst. =

|<2.2, centrality 0% y , 1.2<|

-μ^+μ→ψ

PHENIX J/